Copyright: ATI TV Bar Help v1.0 ©2000 ATI TECHNOLOGIES INC.
Citation: ATI TV Bar Help v1.0 ©2000 ATI TECHNOLOGIES INC.


Introduction

WELCOME to ATI TV Bar on-line Help

Browse the Web and watch TV at the same time, without resizing your windows!  ATI TV Bar displays TV in your Internet Explorer Web Browser.

North American users can also use Gemstar’s GuidePlus+ electronic program guide to display channel names and numbers, with continuously updated channel information.

Note: the program guide is a North American feature.

HOW TO…

Use ATI TV Bar

Use the Program Guide


ATI TV Bar

To open ATI TV Bar

1	Launch Internet Explorer.

2	In Explorer’s menu bar, click View., point to Explorer Bar [image], then click ATI Explorer Bar.

If TV is not running, ATI TV Bar opens it, and displays it in the TV Bar.  Closing ATI TV Bar also closes TV.

If TV is running, it is displayed in TV Bar, and the regular TV display disappears from your desktop.  Closing TV Bar returns TV to its normal display on your desktop.

If you resize Explorer, the TV display automatically fits itself to the new size.

TV controls

Channel Down/Up	Volume slider		Mute


Program Guide

The Program Guide displays a continuously-updated, scrolling list of all available channels with channel names (if available) and the current program (if available).  When it reaches the end of the list, it starts again at the beginning.

Click a row in the Program Guide to switch to the indicated channel.

Program Guide controls

To Top	Page Up/Down	Pause
To Top scrolls the Program Guide to the top of its list, and then lets it resume scrolling.

Page Up scrolls the Program Guide half a page up; Page Down scrolls it half a page down.

Pause stops and starts scrolling.