Copyright: Audio Control Panel, Version 1.05. Copyright Aureal Semiconductor 1997.


Digital Out Tab

S/PDIF Output Rate

This window allows you to select the sample rate of the S/PDIF output channel. When changed, the new rate takes effect immediately. By default, a mixture of all wave, wavetable, and wavetable effects streams are sent out the S/PDIF channel.