Copyright: Audio Control Panel, Version 1.06. Copyright Aureal Semiconductor 1998.


MIDI Tab

Wavetable Mode

64 Voice – Wavetable engine is optimized for 64 voices.

128 Voice – Wavetable engine is optimized for 128 voices.

320 Voice – Wavetable engine is optimized for 320 voices.

Wavetable Effects

When some MIDI songs start, they request particular amounts of effects in the sound, such as chorus and reverb. There are nine possible effects to choose from: Delay,  Room reverb,  Chamber reverb,  Hall reverb,  Cabinet,  Chorus, Flange, Distortion, and Wah-Wah. The same effect can not be selected twice.

Effects Checkbox – You can disable wavetable effects with this checkbox. If effects are disabled, no effects are heard, even if songs request it. This checkbox overrides the slider settings.

Effect 1 and Effect 2 Sliders – These sliders increase the amount of effects over the levels set by the MIDI file using controllers 91 and 93 respectively. You can change these settings while a song is playing.  A zero setting selects the same amount of effect as set in the song. Moving the sliders up increases the effects level until the effect reaches its maximum possible level. If the song sets the maximum possible effect levels, the sliders have no effect.

Download

This button opens a file browser for selecting an alternate instrument set. Press "Open" to download the instruments to the wavetable. The wavetable file must be in DLS format.

After downloading, the new instruments are used instead of the previous instruments. To reload the factory presets, download the file "au30gm.arl” located in the System folder of your Windows directory.