Copyright: Audio Control Panel, Version 1.06. Copyright Aureal Semiconductor 1998.


Digital Out

Output Rate

This window allows you to select the sample rate of the S/PDIF output port. When you select a new sample rate, the S/PDIF port uses the new rate immediately.